<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.3.0">
<drawing>
<board>
<plain>
<wire x1="54.61" y1="58.42" x2="74.6" y2="58.42" width="0" layer="20"/>
<wire x1="74.6" y1="58.42" x2="74.6" y2="73.65" width="0" layer="20"/>
<wire x1="74.6" y1="73.65" x2="54.61" y2="73.65" width="0" layer="20"/>
<wire x1="54.61" y1="73.65" x2="54.61" y2="58.42" width="0" layer="20"/>
</plain>
<libraries>
<library name="pinhead+final project">
<packages>
<package name="1X02_SMT">
</package>
</packages>
</library>
<library name="fab">
<packages>
<package name="USB_MINIB">
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="JP1" library="pinhead+final project" package="1X02_SMT" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$1" library="fab" package="USB_MINIB" value="USB_MINIB">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="GND">
<contactref element="U$1" pad="GND"/>
<contactref element="JP1" pad="2"/>
</signal>
<signal name="VCC">
<contactref element="U$1" pad="VBUS"/>
<contactref element="JP1" pad="1"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
